\section{\class{wxStaticBitmap}}\label{wxstaticbitmap}

A static bitmap control displays a bitmap. It is meant for display of the
small icons in the dialog boxes and is not meant to be a general purpose image
display control. In particular, under Windows 9x the size of bitmap is limited
to $64*64$ pixels and thus you should use your own control if you want to
display larger images portably.

\wxheading{Derived from}

\helpref{wxControl}{wxcontrol}\\
\helpref{wxWindow}{wxwindow}\\
\helpref{wxEvtHandler}{wxevthandler}\\
\helpref{wxObject}{wxobject}

\wxheading{Include files}

<wx/statbmp.h>

\wxheading{Window styles}

There are no special styles for this control.

See also \helpref{window styles overview}{windowstyles}.

\wxheading{See also}

\helpref{wxStaticBitmap}{wxstaticbitmap}, \helpref{wxStaticBox}{wxstaticbox}

\wxheading{Remarks}

The bitmap to be displayed should have a small number of colours, such as 16, to avoid
palette problems.

\latexignore{\rtfignore{\wxheading{Members}}}


\membersection{wxStaticBitmap::wxStaticBitmap}\label{wxstaticbitmapconstr}

\func{}{wxStaticBitmap}{\void}

Default constructor.

\func{}{wxStaticBitmap}{\param{wxWindow* }{parent}, \param{wxWindowID}{ id},\rtfsp
\param{const wxBitmap\& }{label}, \param{const wxPoint\& }{pos = wxDefaultPosition}, \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
\param{long}{ style = 0}, \param{const wxString\& }{name = ``staticBitmap"}}

Constructor, creating and showing a static bitmap control.

\wxheading{Parameters}

\docparam{parent}{Parent window. Should not be NULL.}

\docparam{id}{Control identifier. A value of -1 denotes a default value.}

\docparam{label}{Bitmap label.}

\docparam{pos}{Window position.}

\docparam{size}{Window size.}

\docparam{style}{Window style. See \helpref{wxStaticBitmap}{wxstaticbitmap}.}

\docparam{name}{Window name.}

\wxheading{See also}

\helpref{wxStaticBitmap::Create}{wxstaticbitmapcreate}


\membersection{wxStaticBitmap::Create}\label{wxstaticbitmapcreate}

\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID}{ id},\rtfsp
\param{const wxBitmap\& }{label}, \param{const wxPoint\& }{pos = wxDefaultPosition}, \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
\param{long}{ style = 0}, \param{const wxString\& }{name = ``staticBitmap"}}

Creation function, for two-step construction. For details see \helpref{wxStaticBitmap::wxStaticBitmap}{wxstaticbitmapconstr}.


\membersection{wxStaticBitmap::GetBitmap}\label{wxstaticbitmapgetbitmap}

\constfunc{wxBitmap}{GetBitmap}{\void}

Returns the bitmap currently used in the control. Notice that this method can
be called even if \helpref{SetIcon}{wxstaticbitmapseticon} had been used.

\wxheading{See also}

\helpref{wxStaticBitmap::SetBitmap}{wxstaticbitmapsetbitmap}


\membersection{wxStaticBitmap::GetIcon}\label{wxstaticbitmapgeticon}

\constfunc{wxIcon}{GetIcon}{\void}

Returns the icon currently used in the control. Notice that this method can
only be called if \helpref{SetIcon}{wxstaticbitmapseticon} had been used: an icon
can't be retrieved from the control if a bitmap had been set (using 
\helpref{SetBitmap}{wxstaticbitmapsetbitmap}).

\wxheading{See also}

\helpref{wxStaticBitmap::SetIcon}{wxstaticbitmapseticon}


\membersection{wxStaticBitmap::SetBitmap}\label{wxstaticbitmapsetbitmap}

\func{virtual void}{SetBitmap}{\param{const wxBitmap\& }{ label}}

Sets the bitmap label.

\wxheading{Parameters}

\docparam{label}{The new bitmap.}

\wxheading{See also}

\helpref{wxStaticBitmap::GetBitmap}{wxstaticbitmapgetbitmap}


\membersection{wxStaticBitmap::SetIcon}\label{wxstaticbitmapseticon}

\func{virtual void}{SetIcon}{\param{const wxIcon\& }{ label}}

Sets the label to the given icon.

\wxheading{Parameters}

\docparam{label}{The new icon.}

\wxheading{See also}

\helpref{wxStaticBitmap::GetIcon}{wxstaticbitmapgeticon}

